
 
 Playground is operating on STadel version 3.3c-217 software, installed
 on 02/27/89 and presently undergoing beta-testing.  Currently STadel 
 runs on MS-DOS computers and the Atari ST.  The hardware at Playground 
 is an Atari 520ST w/1meg ram, two 3.5 single-sided disk drives, one 
 20meg ICD FA-ST Hard Drive, and a Hayes-compatible `Parrot' 1200 modem.
 
 Citadel/STadel is a room-structured message system.  The fundamental 
 design goal is to provide a congenial forum conducive to interesting 
 discussions.  The software is intended to be as unobtrusive, unintrusive 
 and unconstraining as possible.  In software as elsewhere, good 
 engineering is whatever gets the job done without calling attention to 
 itself.
 
 If you'd like to know more about STadel software, or you're interested 
 in starting your own BBS, please post e-mail to `orc', the author of 
 STadel software. 
                                    
                              -Betacam-

%BBS  -Go back to BBS Info Shop


